<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.24672705783
cusum  =  0.105917912517
eta  =  0.796375976801
hl_amp_ratio  =  0.429292138188
kurtosis  =  -0.931428779945
n_points  =  257
period  =  0.589078590873
period_SNR  =  32.6635267155
period_log10FAP  =  -30.5638697671
period_uncertainty  =  9.82518191016e-05
phase_cusum  =  0.249324278719
phase_eta  =  0.228317512717
phi21  =  1.15036671581
phi31  =  2.35858264153
quartile31  =  0.33
r21  =  0.432561057258
r31  =  0.303723706938
shapiro_w  =  0.928011953831
skewness  =  -0.490502605777
slope_per10  =  -0.19464527212
slope_per90  =  0.438459928304
stetson_k  =  0.807295133529
weighted_mean  =  14.9682049572
weighted_std  =  0.207672791248
</pre></body></html>