-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.51


######### Lightcurve features #########

amplitude  =  0.156301156086
cusum  =  0.259217815028
eta  =  1.21022565316
hl_amp_ratio  =  1.10084624937
kurtosis  =  -0.838210004056
n_points  =  91
period  =  0.178878088952
period_SNR  =  16.1210682871
period_log10FAP  =  -7.83884530306
period_uncertainty  =  2.07505558163e-05
phase_cusum  =  0.304663915757
phase_eta  =  0.738483137735
phi21  =  0.460796244492
phi31  =  4.3208232224
quartile31  =  0.22
r21  =  0.148075497748
r31  =  0.0695455015841
shapiro_w  =  0.978370845318
skewness  =  0.154104967553
slope_per10  =  -0.118678753217
slope_per90  =  0.118103744413
stetson_k  =  0.853611426663
weighted_mean  =  16.8116222674
weighted_std  =  0.134888672344
