-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.88


######### Lightcurve features #########

amplitude  =  0.273839451727
cusum  =  0.106848110791
eta  =  0.538485863891
hl_amp_ratio  =  0.97324141291
kurtosis  =  -1.22617036621
n_points  =  93
period  =  0.686615316591
period_SNR  =  12.1569406012
period_log10FAP  =  -7.81017766096
period_uncertainty  =  0.000428178969448
phase_cusum  =  0.271153418633
phase_eta  =  0.0634725428927
phi21  =  4.04889996957
phi31  =  5.34815785385
quartile31  =  0.45
r21  =  0.438857520472
r31  =  0.421271957579
shapiro_w  =  0.940535902977
skewness  =  -0.188241195556
slope_per10  =  -0.346951591065
slope_per90  =  0.702055047676
stetson_k  =  0.854773961014
weighted_mean  =  15.8449140893
weighted_std  =  0.245169643576
