-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.243086829203
cusum  =  0.0950228717757
eta  =  0.891590309165
hl_amp_ratio  =  0.530294769704
kurtosis  =  -0.58289094811
n_points  =  297
period  =  0.563536424941
period_SNR  =  39.6268511676
period_log10FAP  =  -32.2431336311
period_uncertainty  =  0.000146907313258
phase_cusum  =  0.216129202349
phase_eta  =  0.482187830262
phi21  =  1.11995781486
phi31  =  2.51906711978
quartile31  =  0.33
r21  =  0.490111231552
r31  =  0.217544812039
shapiro_w  =  0.952750205994
skewness  =  -0.557694957777
slope_per10  =  -0.140906665158
slope_per90  =  0.171683878502
stetson_k  =  0.768705886143
weighted_mean  =  15.2380590228
weighted_std  =  0.230342600418
