-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.92


######### Lightcurve features #########

amplitude  =  0.315720320318
cusum  =  0.188653489628
eta  =  0.554869049184
hl_amp_ratio  =  0.452993903276
kurtosis  =  -1.1341940097
n_points  =  279
period  =  0.52234685173
period_SNR  =  36.4704984525
period_log10FAP  =  -31.9515130136
period_uncertainty  =  0.000156588194338
phase_cusum  =  0.238944246309
phase_eta  =  0.0686891692333
phi21  =  -2.35377520294
phi31  =  -1.36474195244
quartile31  =  0.6
r21  =  0.583971055574
r31  =  0.419298900165
shapiro_w  =  0.903503715992
skewness  =  -0.512028884127
slope_per10  =  -0.128625180758
slope_per90  =  0.152140194995
stetson_k  =  0.780864315249
weighted_mean  =  14.7251646701
weighted_std  =  0.336909318511
