-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.92


######### Lightcurve features #########

amplitude  =  0.238278449486
cusum  =  0.166112707115
eta  =  0.579131449751
hl_amp_ratio  =  0.708620772184
kurtosis  =  -1.02941452983
n_points  =  298
period  =  0.55952360542
period_SNR  =  41.8712648245
period_log10FAP  =  -35.0610416182
period_uncertainty  =  0.000143716339827
phase_cusum  =  0.25946281596
phase_eta  =  0.16200649063
phi21  =  -2.01048689988
phi31  =  -0.505472588262
quartile31  =  0.33
r21  =  0.569122174029
r31  =  0.290456524034
shapiro_w  =  0.959068894386
skewness  =  -0.189301952272
slope_per10  =  -0.140833360912
slope_per90  =  0.250134928212
stetson_k  =  0.846247794526
weighted_mean  =  15.2502775037
weighted_std  =  0.20079663618
