-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_d
class_probability =  0.63


######### Lightcurve features #########

amplitude  =  0.178774925958
cusum  =  0.156897865437
eta  =  0.500333550265
hl_amp_ratio  =  0.610581050183
kurtosis  =  0.122153710152
n_points  =  297
period  =  0.371370535806
period_SNR  =  30.5239310561
period_log10FAP  =  -22.7447215196
period_uncertainty  =  4.74898391149e-05
phase_cusum  =  0.199621306316
phase_eta  =  1.15592898847
phi21  =  4.01691201175
phi31  =  3.35631093592
quartile31  =  0.23
r21  =  0.0632661950666
r31  =  0.17333968084
shapiro_w  =  0.937696993351
skewness  =  -0.817730798772
slope_per10  =  -0.0460967542796
slope_per90  =  0.0496162970626
stetson_k  =  0.784684301975
weighted_mean  =  13.8329126094
weighted_std  =  0.177558275881
