-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.325484199017
cusum  =  0.103028027307
eta  =  0.591951413366
hl_amp_ratio  =  0.472749711862
kurtosis  =  -0.449438002708
n_points  =  296
period  =  0.466778108586
period_SNR  =  43.6078501176
period_log10FAP  =  -34.6093807047
period_uncertainty  =  0.000100059620299
phase_cusum  =  0.251847491404
phase_eta  =  0.409216342786
phi21  =  -2.27824071818
phi31  =  -4.33685422834
quartile31  =  0.41
r21  =  0.452619219779
r31  =  0.27492181298
shapiro_w  =  0.932384133339
skewness  =  -0.711039529037
slope_per10  =  -0.112859365562
slope_per90  =  0.107618798763
stetson_k  =  0.737516725028
weighted_mean  =  14.9281492106
weighted_std  =  0.291143854928
