-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.255048760891
cusum  =  0.125942225458
eta  =  0.594071469285
hl_amp_ratio  =  0.440650402025
kurtosis  =  -0.718162517062
n_points  =  297
period  =  0.673258035714
period_SNR  =  44.7476104867
period_log10FAP  =  -38.5118820519
period_uncertainty  =  0.000156135916494
phase_cusum  =  0.282675159469
phase_eta  =  0.203762289966
phi21  =  4.07037368635
phi31  =  5.07810116558
quartile31  =  0.35
r21  =  0.457956324718
r31  =  0.329168849048
shapiro_w  =  0.924794733524
skewness  =  -0.63569755183
slope_per10  =  -0.222319047902
slope_per90  =  0.251693757877
stetson_k  =  0.756509591112
weighted_mean  =  15.5629702607
weighted_std  =  0.227656355124
