-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.342490147933
cusum  =  0.157726410798
eta  =  0.571021172802
hl_amp_ratio  =  0.73410892487
kurtosis  =  -0.933781953688
n_points  =  299
period  =  0.569919066527
period_SNR  =  41.9020036443
period_log10FAP  =  -36.8435128506
period_uncertainty  =  0.000130475983468
phase_cusum  =  0.209255211542
phase_eta  =  0.368233879739
phi21  =  1.03922696875
phi31  =  2.44996321062
quartile31  =  0.45
r21  =  0.437194656626
r31  =  0.275973192312
shapiro_w  =  0.945671081543
skewness  =  -0.410038996593
slope_per10  =  -0.0814267414147
slope_per90  =  0.102672468744
stetson_k  =  0.826080082738
weighted_mean  =  15.587358126
weighted_std  =  0.296689941835
