<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.350806628006
cusum  =  0.167203616968
eta  =  0.56739588103
hl_amp_ratio  =  0.413694209537
kurtosis  =  -0.509504752748
n_points  =  299
period  =  0.50872082039
period_SNR  =  43.6292752009
period_log10FAP  =  -36.2105104845
period_uncertainty  =  0.000118818369296
phase_cusum  =  0.25149976662
phase_eta  =  0.152724693208
phi21  =  0.82351267266
phi31  =  1.98951855895
quartile31  =  0.43
r21  =  0.478549601102
r31  =  0.341715053965
shapiro_w  =  0.906994700432
skewness  =  -0.777765562911
slope_per10  =  -0.13225843058
slope_per90  =  0.182649993803
stetson_k  =  0.739037028589
weighted_mean  =  15.3624033499
weighted_std  =  0.297463336078
</pre></body></html>