-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.88


######### Lightcurve features #########

amplitude  =  0.380909614896
cusum  =  0.120924665746
eta  =  0.645403648391
hl_amp_ratio  =  0.40705272715
kurtosis  =  -1.00807319514
n_points  =  299
period  =  0.588473675785
period_SNR  =  46.0623093379
period_log10FAP  =  -40.2165785791
period_uncertainty  =  0.000158971760938
phase_cusum  =  0.317694884448
phase_eta  =  0.169750439645
phi21  =  0.793109772369
phi31  =  1.93615854075
quartile31  =  0.595
r21  =  0.428854391485
r31  =  0.316901892678
shapiro_w  =  0.900444746017
skewness  =  -0.556001825803
slope_per10  =  -0.121700065295
slope_per90  =  0.138607305992
stetson_k  =  0.749723174121
weighted_mean  =  15.6166103442
weighted_std  =  0.360348585863
