-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.29


######### Lightcurve features #########

amplitude  =  0.383126709983
cusum  =  0.182380202333
eta  =  1.35331659554
hl_amp_ratio  =  2.06289885365
kurtosis  =  -1.09628121159
n_points  =  380
period  =  0.595546085202
period_SNR  =  25.0435800592
period_log10FAP  =  -16.3596593205
period_uncertainty  =  0.000142543350556
phase_cusum  =  0.197544955939
phase_eta  =  1.27975351295
phi21  =  -2.27619101937
phi31  =  -0.700340107735
quartile31  =  0.945
r21  =  0.56378328531
r31  =  0.451976490097
shapiro_w  =  0.92266279459
skewness  =  0.440139477671
slope_per10  =  -0.0256862189306
slope_per90  =  0.060662560816
stetson_k  =  0.828459457458
weighted_mean  =  15.8516280877
weighted_std  =  0.553250309313
