-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.270672694945
cusum  =  0.185174307694
eta  =  0.499568314155
hl_amp_ratio  =  0.533057951279
kurtosis  =  -0.882484630243
n_points  =  281
period  =  0.587521260368
period_SNR  =  40.6239701477
period_log10FAP  =  -35.4712149914
period_uncertainty  =  0.00011885925236
phase_cusum  =  0.236442548214
phase_eta  =  0.165517962269
phi21  =  -2.28461990182
phi31  =  -4.1216694971
quartile31  =  0.43
r21  =  0.51652619828
r31  =  0.313271769941
shapiro_w  =  0.932847738266
skewness  =  -0.534619401834
slope_per10  =  -0.134128742549
slope_per90  =  0.225997913764
stetson_k  =  0.793970311427
weighted_mean  =  14.3052316843
weighted_std  =  0.254572939312
