-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.8


######### Lightcurve features #########

amplitude  =  0.429558440709
cusum  =  0.0664798458596
eta  =  0.614431363992
hl_amp_ratio  =  0.517125754853
kurtosis  =  -0.918320897729
n_points  =  297
period  =  0.617589782378
period_SNR  =  37.8392648381
period_log10FAP  =  -31.8130550933
period_uncertainty  =  0.000109455161101
phase_cusum  =  0.216381765645
phase_eta  =  0.5095794093
phi21  =  0.86775242443
phi31  =  2.15004291155
quartile31  =  0.63
r21  =  0.425927917163
r31  =  0.333207458804
shapiro_w  =  0.903806984425
skewness  =  -0.590534400821
slope_per10  =  -0.139755743143
slope_per90  =  0.174407710038
stetson_k  =  0.821551289349
weighted_mean  =  12.7273811386
weighted_std  =  0.393573206754
