<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.236851252075
cusum  =  0.127964573297
eta  =  0.76972621625
hl_amp_ratio  =  0.872297418013
kurtosis  =  -0.810017307887
n_points  =  514
period  =  0.809999327817
period_SNR  =  50.9081692373
period_log10FAP  =  -65.6788462387
period_uncertainty  =  0.000263500129412
phase_cusum  =  0.280115489949
phase_eta  =  0.393092744003
phi21  =  -1.68783860197
phi31  =  -3.24191537381
quartile31  =  0.3275
r21  =  0.484343754975
r31  =  0.262138603498
shapiro_w  =  0.982102692127
skewness  =  -0.0565166832051
slope_per10  =  -0.122943296904
slope_per90  =  0.0887952000632
stetson_k  =  0.842390300715
weighted_mean  =  15.4069263137
weighted_std  =  0.195404034387
</pre></body></html>