-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.277508463194
cusum  =  0.142178622903
eta  =  0.538706080771
hl_amp_ratio  =  0.589538234873
kurtosis  =  -0.670797649114
n_points  =  296
period  =  0.552934159736
period_SNR  =  38.9224477441
period_log10FAP  =  -34.0217120906
period_uncertainty  =  0.000157941087933
phase_cusum  =  0.239778824533
phase_eta  =  0.226928489799
phi21  =  1.16946699665
phi31  =  -0.578403420788
quartile31  =  0.3425
r21  =  0.565101274999
r31  =  0.318629436205
shapiro_w  =  0.963471770287
skewness  =  -0.372716278539
slope_per10  =  -0.133683891055
slope_per90  =  0.194513751918
stetson_k  =  0.786533464142
weighted_mean  =  15.0372107211
weighted_std  =  0.249183235893
