-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.96


######### Lightcurve features #########

amplitude  =  0.36860053463
cusum  =  0.152229661994
eta  =  0.517518179689
hl_amp_ratio  =  0.355929943808
kurtosis  =  -0.567266286405
n_points  =  294
period  =  0.585036698227
period_SNR  =  40.6801671642
period_log10FAP  =  -34.7077268289
period_uncertainty  =  0.000117855906924
phase_cusum  =  0.285546888013
phase_eta  =  0.139447190416
phi21  =  0.880921487876
phi31  =  1.97670024558
quartile31  =  0.445
r21  =  0.573245003962
r31  =  0.340004284089
shapiro_w  =  0.886149525642
skewness  =  -0.821754904704
slope_per10  =  -0.133419823718
slope_per90  =  0.181014485794
stetson_k  =  0.70857751714
weighted_mean  =  14.9765168457
weighted_std  =  0.339326706599
