-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.179912913332
cusum  =  0.0917962537521
eta  =  0.658827339487
hl_amp_ratio  =  0.745606381232
kurtosis  =  -1.093435827
n_points  =  299
period  =  0.606540104428
period_SNR  =  46.9651581287
period_log10FAP  =  -40.7001571939
period_uncertainty  =  0.000190005620222
phase_cusum  =  0.238986574648
phase_eta  =  0.310361328391
phi21  =  1.17871157279
phi31  =  -0.62848599018
quartile31  =  0.27
r21  =  0.385107344506
r31  =  0.26332664023
shapiro_w  =  0.955046415329
skewness  =  -0.245533205101
slope_per10  =  -0.179137462838
slope_per90  =  0.118581345841
stetson_k  =  0.840141657622
weighted_mean  =  15.5937982142
weighted_std  =  0.163863190044
