-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.186463226886
cusum  =  0.13710118098
eta  =  0.553921720903
hl_amp_ratio  =  1.05549110745
kurtosis  =  -1.00747892239
n_points  =  294
period  =  0.584997415564
period_SNR  =  42.1086112079
period_log10FAP  =  -35.7045794686
period_uncertainty  =  0.000117840080434
phase_cusum  =  0.268256971118
phase_eta  =  0.270924162879
phi21  =  -2.02533666481
phi31  =  -3.52565506322
quartile31  =  0.25
r21  =  0.469580849433
r31  =  0.258041341586
shapiro_w  =  0.97274941206
skewness  =  0.0323366787348
slope_per10  =  -0.121969172191
slope_per90  =  0.17493174515
stetson_k  =  0.838028992463
weighted_mean  =  14.8654185437
weighted_std  =  0.155465683238
