<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.20733564265
cusum  =  0.125515511041
eta  =  0.707177835126
hl_amp_ratio  =  0.870764785369
kurtosis  =  -1.12559677454
n_points  =  282
period  =  0.593120214373
period_SNR  =  41.6397898713
period_log10FAP  =  -38.0097289196
period_uncertainty  =  0.000121094373029
phase_cusum  =  0.249407751062
phase_eta  =  0.160118938039
phi21  =  -1.97484109296
phi31  =  -3.74526198199
quartile31  =  0.2775
r21  =  0.4641430725
r31  =  0.219764324998
shapiro_w  =  0.950788497925
skewness  =  -0.231587769288
slope_per10  =  -0.223105917143
slope_per90  =  0.270746839764
stetson_k  =  0.870152541468
weighted_mean  =  13.7612487698
weighted_std  =  0.171347155159
</pre></body></html>