<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.322885278126
cusum  =  0.132554295393
eta  =  0.886914282978
hl_amp_ratio  =  0.385586976328
kurtosis  =  0.385750915291
n_points  =  290
period  =  0.516254383148
period_SNR  =  32.8642764187
period_log10FAP  =  -24.8059043456
period_uncertainty  =  0.000122378667854
phase_cusum  =  0.340673160609
phase_eta  =  0.619871580252
phi21  =  -2.40747653554
phi31  =  -1.75672793494
quartile31  =  0.3275
r21  =  0.415769921118
r31  =  0.237886357561
shapiro_w  =  0.925329506397
skewness  =  -0.942703993335
slope_per10  =  -0.0755763701255
slope_per90  =  0.0794480629722
stetson_k  =  0.670724256104
weighted_mean  =  16.9425205164
weighted_std  =  0.264365095923
</pre></body></html>