-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.228478728867
cusum  =  0.134275267073
eta  =  0.606158590275
hl_amp_ratio  =  0.686678144856
kurtosis  =  -0.83850379578
n_points  =  294
period  =  0.756741640754
period_SNR  =  41.9852849666
period_log10FAP  =  -34.312481357
period_uncertainty  =  0.000197222227374
phase_cusum  =  0.30371576551
phase_eta  =  0.468165815865
phi21  =  -1.92853634725
phi31  =  -3.78307309286
quartile31  =  0.32
r21  =  0.455805218639
r31  =  0.287544701393
shapiro_w  =  0.973346531391
skewness  =  -0.258694606563
slope_per10  =  -0.131946236372
slope_per90  =  0.253259719954
stetson_k  =  0.818781976674
weighted_mean  =  15.8158869081
weighted_std  =  0.196653122893
