-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.92


######### Lightcurve features #########

amplitude  =  0.224489762976
cusum  =  0.146466060483
eta  =  0.682761098475
hl_amp_ratio  =  0.959448138926
kurtosis  =  -1.35738890371
n_points  =  294
period  =  0.610451689322
period_SNR  =  48.988931793
period_log10FAP  =  -44.6198126232
period_uncertainty  =  0.000171114711782
phase_cusum  =  0.245877983687
phase_eta  =  0.103784994563
phi21  =  -2.16372875588
phi31  =  -1.0026887038
quartile31  =  0.36
r21  =  0.405852895193
r31  =  0.255487505208
shapiro_w  =  0.927901208401
skewness  =  -0.148479039837
slope_per10  =  -0.197996360734
slope_per90  =  0.275433334354
stetson_k  =  0.881817369771
weighted_mean  =  14.6383221557
weighted_std  =  0.19510938744
