-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.255575058787
cusum  =  0.0930008132956
eta  =  0.607815663996
hl_amp_ratio  =  0.355271012612
kurtosis  =  -0.844591037812
n_points  =  281
period  =  0.632690267151
period_SNR  =  42.2357509612
period_log10FAP  =  -35.000026443
period_uncertainty  =  0.000206641491668
phase_cusum  =  0.288468415534
phase_eta  =  0.289840972399
phi21  =  -2.0280640871
phi31  =  -3.78243307247
quartile31  =  0.35
r21  =  0.406686983784
r31  =  0.266423704896
shapiro_w  =  0.91727745533
skewness  =  -0.604857332768
slope_per10  =  -0.193707311294
slope_per90  =  0.259888434672
stetson_k  =  0.745077190842
weighted_mean  =  14.9640580173
weighted_std  =  0.217075791829
