-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.171984560587
cusum  =  0.189244900566
eta  =  0.660736692591
hl_amp_ratio  =  0.555552139025
kurtosis  =  -0.407715383263
n_points  =  292
period  =  0.608532968499
period_SNR  =  35.4248513885
period_log10FAP  =  -27.3367629898
period_uncertainty  =  0.00014879596854
phase_cusum  =  0.251672223734
phase_eta  =  0.701797418138
phi21  =  0.785860290977
phi31  =  2.13769412045
quartile31  =  0.25
r21  =  0.44824858107
r31  =  0.217607719248
shapiro_w  =  0.968926012516
skewness  =  -0.506115914596
slope_per10  =  -0.119130945896
slope_per90  =  0.131442947081
stetson_k  =  0.751347791261
weighted_mean  =  16.3459235449
weighted_std  =  0.170364750021
