-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.311975208387
cusum  =  0.174874830384
eta  =  0.617050886088
hl_amp_ratio  =  0.364552948596
kurtosis  =  -0.568048847843
n_points  =  294
period  =  0.573634876877
period_SNR  =  37.0095871503
period_log10FAP  =  -28.9917952561
period_uncertainty  =  0.000113306867117
phase_cusum  =  0.243378581176
phase_eta  =  0.572186741099
phi21  =  -2.37750120593
phi31  =  -4.33430905096
quartile31  =  0.4
r21  =  0.527074800288
r31  =  0.31528887834
shapiro_w  =  0.908144593239
skewness  =  -0.750992178828
slope_per10  =  -0.0991049372723
slope_per90  =  0.154065150552
stetson_k  =  0.722817995421
weighted_mean  =  15.6204580606
weighted_std  =  0.312255203458
