-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.94


######### Lightcurve features #########

amplitude  =  0.246194439387
cusum  =  0.159197563473
eta  =  0.532622658407
hl_amp_ratio  =  0.688996833111
kurtosis  =  -1.21957879856
n_points  =  294
period  =  0.779072387553
period_SNR  =  47.2728409591
period_log10FAP  =  -42.9918798047
period_uncertainty  =  0.000278712988467
phase_cusum  =  0.273218003318
phase_eta  =  0.0561457240933
phi21  =  1.2286293223
phi31  =  2.64699651348
quartile31  =  0.4
r21  =  0.471506407569
r31  =  0.281385961822
shapiro_w  =  0.927955508232
skewness  =  -0.321571036902
slope_per10  =  -0.260925849596
slope_per90  =  0.425936739489
stetson_k  =  0.859559235243
weighted_mean  =  14.4673600568
weighted_std  =  0.222006002184
