-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.91


######### Lightcurve features #########

amplitude  =  0.167676884163
cusum  =  0.123930007405
eta  =  0.604386351499
hl_amp_ratio  =  0.940486275824
kurtosis  =  -0.872584342696
n_points  =  295
period  =  0.604228206533
period_SNR  =  51.8024949174
period_log10FAP  =  -44.8299517237
period_uncertainty  =  0.000104769771115
phase_cusum  =  0.22484608443
phase_eta  =  0.229626246033
phi21  =  -2.01154680338
phi31  =  -3.56059982098
quartile31  =  0.2
r21  =  0.358941727559
r31  =  0.170242587116
shapiro_w  =  0.979682683945
skewness  =  0.0271860560726
slope_per10  =  -0.175839175801
slope_per90  =  0.230878756091
stetson_k  =  0.843464482147
weighted_mean  =  15.2900227854
weighted_std  =  0.120784620898
