-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.195120813322
cusum  =  0.176205297738
eta  =  0.650341540254
hl_amp_ratio  =  0.68038088877
kurtosis  =  -0.956842084414
n_points  =  282
period  =  0.61195241343
period_SNR  =  45.9863309743
period_log10FAP  =  -39.5060908064
period_uncertainty  =  0.000128949731109
phase_cusum  =  0.266827362878
phase_eta  =  0.230803349959
phi21  =  -2.16738180602
phi31  =  -4.14033927388
quartile31  =  0.305
r21  =  0.408169967612
r31  =  0.273141248626
shapiro_w  =  0.95068448782
skewness  =  -0.389321034184
slope_per10  =  -0.173217416909
slope_per90  =  0.181370440868
stetson_k  =  0.830148625152
weighted_mean  =  15.6017992238
weighted_std  =  0.176150118777
