-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.313934219779
cusum  =  0.104528118834
eta  =  0.673198271503
hl_amp_ratio  =  0.558145767553
kurtosis  =  -0.847414758486
n_points  =  284
period  =  0.553830874048
period_SNR  =  39.6457887018
period_log10FAP  =  -32.1954788093
period_uncertainty  =  0.000106390003423
phase_cusum  =  0.231285442545
phase_eta  =  0.186929611697
phi21  =  -2.18516232323
phi31  =  -3.94818150833
quartile31  =  0.44
r21  =  0.549356028251
r31  =  0.327654812743
shapiro_w  =  0.961492359638
skewness  =  -0.360561220059
slope_per10  =  -0.0969470885924
slope_per90  =  0.123706407739
stetson_k  =  0.778050537893
weighted_mean  =  16.2867440412
weighted_std  =  0.285368201156
