-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.266528252493
cusum  =  0.0995973946324
eta  =  0.651077044104
hl_amp_ratio  =  0.355866057658
kurtosis  =  -0.6203465591
n_points  =  284
period  =  0.521125883162
period_SNR  =  42.9154341652
period_log10FAP  =  -36.0690304715
period_uncertainty  =  0.000140246792965
phase_cusum  =  0.249493942665
phase_eta  =  0.330033380762
phi21  =  0.764297067504
phi31  =  2.07658142749
quartile31  =  0.36
r21  =  0.440232017566
r31  =  0.265192359266
shapiro_w  =  0.919334411621
skewness  =  -0.695867712382
slope_per10  =  -0.107268374582
slope_per90  =  0.164971412447
stetson_k  =  0.741954740509
weighted_mean  =  14.9267378701
weighted_std  =  0.2449125436
