-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.299376048888
cusum  =  0.129224829548
eta  =  0.567793764251
hl_amp_ratio  =  0.744462060302
kurtosis  =  -1.05811003125
n_points  =  283
period  =  0.662083293563
period_SNR  =  39.249959858
period_log10FAP  =  -34.6656229169
period_uncertainty  =  0.000150942319623
phase_cusum  =  0.254203605395
phase_eta  =  0.0860556762735
phi21  =  0.918407726146
phi31  =  -1.04822119669
quartile31  =  0.44
r21  =  0.446990419422
r31  =  0.336001823736
shapiro_w  =  0.952627182007
skewness  =  -0.298704049591
slope_per10  =  -0.19803933221
slope_per90  =  0.285706391229
stetson_k  =  0.82530594411
weighted_mean  =  15.5176119461
weighted_std  =  0.257979616885
