-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.96


######### Lightcurve features #########

amplitude  =  0.310876157864
cusum  =  0.112101038759
eta  =  0.653458724093
hl_amp_ratio  =  0.515835311142
kurtosis  =  -1.23669075216
n_points  =  297
period  =  0.586415268224
period_SNR  =  48.084304464
period_log10FAP  =  -40.9948847779
period_uncertainty  =  0.000138137942547
phase_cusum  =  0.244815227184
phase_eta  =  0.0984085893914
phi21  =  -2.20715820263
phi31  =  -0.97604171765
quartile31  =  0.54
r21  =  0.478603230625
r31  =  0.30144260352
shapiro_w  =  0.912207126617
skewness  =  -0.406653954533
slope_per10  =  -0.176585958488
slope_per90  =  0.209679997526
stetson_k  =  0.809107994478
weighted_mean  =  15.40400242
weighted_std  =  0.296384721501
