-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.362596123284
cusum  =  0.155759449087
eta  =  0.67880110642
hl_amp_ratio  =  0.323947972666
kurtosis  =  -0.217619891615
n_points  =  281
period  =  0.478963939527
period_SNR  =  45.3241520784
period_log10FAP  =  -38.9494108324
period_uncertainty  =  0.000118496775972
phase_cusum  =  0.290126600595
phase_eta  =  0.205471115108
phi21  =  -2.46983096584
phi31  =  -4.82719329745
quartile31  =  0.37
r21  =  0.445708234827
r31  =  0.190543236088
shapiro_w  =  0.890201807022
skewness  =  -0.923216808606
slope_per10  =  -0.079348607424
slope_per90  =  0.0910597575104
stetson_k  =  0.690969864199
weighted_mean  =  16.3070487961
weighted_std  =  0.285453100714
