-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.312948621446
cusum  =  0.160965563983
eta  =  0.544740167053
hl_amp_ratio  =  0.415065792188
kurtosis  =  -0.5231662354
n_points  =  297
period  =  0.51534198746
period_SNR  =  40.2830425164
period_log10FAP  =  -31.9154748285
period_uncertainty  =  0.00010668344661
phase_cusum  =  0.208805770522
phase_eta  =  0.57409979099
phi21  =  -2.25476277672
phi31  =  -0.905619147902
quartile31  =  0.42
r21  =  0.361269025578
r31  =  0.206355654197
shapiro_w  =  0.938722074032
skewness  =  -0.648220603753
slope_per10  =  -0.0684280557204
slope_per90  =  0.0684538572974
stetson_k  =  0.743036761236
weighted_mean  =  16.0383416798
weighted_std  =  0.278737318055
