<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.77


######### Lightcurve features #########

amplitude  =  0.29294508636
cusum  =  0.113374978664
eta  =  0.777925167899
hl_amp_ratio  =  0.538064283087
kurtosis  =  -0.802825115915
n_points  =  270
period  =  0.377709802175
period_SNR  =  39.979943855
period_log10FAP  =  -32.9066783516
period_uncertainty  =  7.42159710124e-05
phase_cusum  =  0.29157453618
phase_eta  =  0.561483311295
phi21  =  -2.1662118231
phi31  =  -0.392886181036
quartile31  =  0.44
r21  =  0.337531265329
r31  =  0.140477072012
shapiro_w  =  0.949127197266
skewness  =  -0.459250150299
slope_per10  =  -0.0757023506544
slope_per90  =  0.0540076321975
stetson_k  =  0.769941383057
weighted_mean  =  15.8780837761
weighted_std  =  0.27742187756
</pre></body></html>