-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.238637124205
cusum  =  0.0718708868301
eta  =  0.764336351902
hl_amp_ratio  =  0.391326451864
kurtosis  =  -0.158254019361
n_points  =  292
period  =  0.61454268463
period_SNR  =  45.4189858826
period_log10FAP  =  -38.5238880421
period_uncertainty  =  0.000108377310768
phase_cusum  =  0.207184659189
phase_eta  =  0.232388236557
phi21  =  -2.3969123483
phi31  =  -1.23777936865
quartile31  =  0.26
r21  =  0.393359971376
r31  =  0.275245270074
shapiro_w  =  0.927328705788
skewness  =  -0.733682584899
slope_per10  =  -0.217048417495
slope_per90  =  0.292565270505
stetson_k  =  0.75129267101
weighted_mean  =  15.0727473737
weighted_std  =  0.186652614833
