-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.254749353676
cusum  =  0.122955072343
eta  =  0.78912312861
hl_amp_ratio  =  0.454702851361
kurtosis  =  -0.127015012268
n_points  =  290
period  =  0.477364069914
period_SNR  =  41.7134384106
period_log10FAP  =  -31.0491173244
period_uncertainty  =  0.00010464494703
phase_cusum  =  0.233056830585
phase_eta  =  0.424513365312
phi21  =  3.93674068272
phi31  =  5.13758047236
quartile31  =  0.2575
r21  =  0.489729190908
r31  =  0.230687559953
shapiro_w  =  0.942784249783
skewness  =  -0.728134325437
slope_per10  =  -0.0945766535951
slope_per90  =  0.130979126876
stetson_k  =  0.735163927566
weighted_mean  =  14.0995976688
weighted_std  =  0.197356388742
