-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.30017961294
cusum  =  0.173231223395
eta  =  0.478478291379
hl_amp_ratio  =  0.350452024533
kurtosis  =  -0.84378987843
n_points  =  293
period  =  0.62706
period_SNR  =  42.3920087037
period_log10FAP  =  -36.0993975649
period_uncertainty  =  0.000112837403637
phase_cusum  =  0.290105623047
phase_eta  =  0.156899780298
phi21  =  -2.21813583635
phi31  =  -4.02642527924
quartile31  =  0.43
r21  =  0.496781676539
r31  =  0.2764247769
shapiro_w  =  0.910014688969
skewness  =  -0.637411506325
slope_per10  =  -0.0968999988317
slope_per90  =  0.268600006718
stetson_k  =  0.739097762167
weighted_mean  =  14.6318645007
weighted_std  =  0.265570191428
