-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.347469191784
cusum  =  0.183106581903
eta  =  0.76217226298
hl_amp_ratio  =  0.503117092493
kurtosis  =  -0.50163144417
n_points  =  287
period  =  0.496685358303
period_SNR  =  39.4975547621
period_log10FAP  =  -27.653880514
period_uncertainty  =  0.000113275644568
phase_cusum  =  0.239182175707
phase_eta  =  0.357148069459
phi21  =  -2.14974437443
phi31  =  -3.87225928763
quartile31  =  0.55
r21  =  0.544903750424
r31  =  0.381590121104
shapiro_w  =  0.959435224533
skewness  =  -0.223754682471
slope_per10  =  -0.0908797831338
slope_per90  =  0.104963751919
stetson_k  =  0.754674370848
weighted_mean  =  16.1326596754
weighted_std  =  0.351380716364
