-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.94


######### Lightcurve features #########

amplitude  =  0.34059152809
cusum  =  0.134777195994
eta  =  0.630996405187
hl_amp_ratio  =  0.87471764303
kurtosis  =  -1.23709288064
n_points  =  317
period  =  0.730900624371
period_SNR  =  50.7725384833
period_log10FAP  =  -46.6934787344
period_uncertainty  =  0.000184013260498
phase_cusum  =  0.232539419238
phase_eta  =  0.0730903786528
phi21  =  -1.87664886175
phi31  =  -0.540817692526
quartile31  =  0.53
r21  =  0.438770086573
r31  =  0.29989004279
shapiro_w  =  0.941288352013
skewness  =  -0.211229845439
slope_per10  =  -0.209046698276
slope_per90  =  0.232709671744
stetson_k  =  0.844527514372
weighted_mean  =  15.6449495382
weighted_std  =  0.299256517273
