-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.328918561035
cusum  =  0.143184260535
eta  =  0.613011025555
hl_amp_ratio  =  0.421595594524
kurtosis  =  -0.374968912233
n_points  =  289
period  =  0.614281736586
period_SNR  =  41.8955124801
period_log10FAP  =  -35.8106795634
period_uncertainty  =  0.000151621028558
phase_cusum  =  0.277770600008
phase_eta  =  0.0254038273962
phi21  =  0.834039811415
phi31  =  -1.26834127186
quartile31  =  0.39
r21  =  0.536978569283
r31  =  0.317307529694
shapiro_w  =  0.92388266325
skewness  =  -0.746980841301
slope_per10  =  -0.228926948171
slope_per90  =  0.293249419478
stetson_k  =  0.74930385731
weighted_mean  =  13.4096475025
weighted_std  =  0.264150874424
