-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.270272909679
cusum  =  0.108729494922
eta  =  0.631025060744
hl_amp_ratio  =  0.436612993958
kurtosis  =  -0.650914665704
n_points  =  285
period  =  0.683161442014
period_SNR  =  43.0569344305
period_log10FAP  =  -35.0007916489
period_uncertainty  =  0.000160706064413
phase_cusum  =  0.235361988913
phase_eta  =  0.275846195217
phi21  =  4.10464852909
phi31  =  5.32789977355
quartile31  =  0.4
r21  =  0.462836132473
r31  =  0.27579820288
shapiro_w  =  0.921064913273
skewness  =  -0.659188961604
slope_per10  =  -0.230016495451
slope_per90  =  0.257612679185
stetson_k  =  0.775412399079
weighted_mean  =  13.2480268784
weighted_std  =  0.244429407896
