-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.92


######### Lightcurve features #########

amplitude  =  0.260126507505
cusum  =  0.25044697774
eta  =  0.603149551128
hl_amp_ratio  =  1.15990036664
kurtosis  =  -0.975635960357
n_points  =  279
period  =  0.723438187329
period_SNR  =  42.6951511112
period_log10FAP  =  -36.5650138724
period_uncertainty  =  0.000330419436423
phase_cusum  =  0.272374555498
phase_eta  =  0.13097866571
phi21  =  -1.98973280678
phi31  =  -3.81397141505
quartile31  =  0.4
r21  =  0.514725927997
r31  =  0.308151350282
shapiro_w  =  0.963383793831
skewness  =  -0.15884169852
slope_per10  =  -0.226653115705
slope_per90  =  0.270908054212
stetson_k  =  0.844359285734
weighted_mean  =  15.4823017228
weighted_std  =  0.224562540362
