-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.277764274816
cusum  =  0.157068716833
eta  =  0.527429516039
hl_amp_ratio  =  0.666771068529
kurtosis  =  -0.575626217141
n_points  =  277
period  =  0.554892432966
period_SNR  =  36.0312449356
period_log10FAP  =  -28.2764695017
period_uncertainty  =  0.000106023651976
phase_cusum  =  0.260135293266
phase_eta  =  0.230935134506
phi21  =  1.01362996284
phi31  =  2.33650139298
quartile31  =  0.32
r21  =  0.56734865076
r31  =  0.348252328517
shapiro_w  =  0.968211710453
skewness  =  -0.408574819296
slope_per10  =  -0.179233068842
slope_per90  =  0.327212680991
stetson_k  =  0.808236783151
weighted_mean  =  14.3717620341
weighted_std  =  0.232248752207
