-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.96


######### Lightcurve features #########

amplitude  =  0.396953277831
cusum  =  0.144446924896
eta  =  0.743654938014
hl_amp_ratio  =  0.263591811675
kurtosis  =  0.352968315024
n_points  =  162
period  =  0.440191479465
period_SNR  =  26.9689563615
period_log10FAP  =  -17.2453781453
period_uncertainty  =  0.000100817475581
phase_cusum  =  0.263707233825
phase_eta  =  0.222975440431
phi21  =  1.04440049173
phi31  =  2.02854910797
quartile31  =  0.4775
r21  =  0.503531392794
r31  =  0.341511159586
shapiro_w  =  0.881263196468
skewness  =  -1.0724684768
slope_per10  =  -0.0803675661105
slope_per90  =  0.214800004615
stetson_k  =  0.684652243827
weighted_mean  =  13.3572533517
weighted_std  =  0.362443938022
