-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.222106841155
cusum  =  0.127448080205
eta  =  0.733661149344
hl_amp_ratio  =  0.9365218629
kurtosis  =  -1.04214882613
n_points  =  259
period  =  0.578952663527
period_SNR  =  39.5000344876
period_log10FAP  =  -29.8386207216
period_uncertainty  =  0.000134416877569
phase_cusum  =  0.234715499137
phase_eta  =  0.459499253224
phi21  =  1.04331705628
phi31  =  2.37882458245
quartile31  =  0.34
r21  =  0.477893002625
r31  =  0.29379851397
shapiro_w  =  0.961276233196
skewness  =  -0.166855127703
slope_per10  =  -0.118499667084
slope_per90  =  0.247982470132
stetson_k  =  0.872540409607
weighted_mean  =  15.1408542603
weighted_std  =  0.208704805354
