-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.82


######### Lightcurve features #########

amplitude  =  0.246812207056
cusum  =  0.15636587327
eta  =  0.770544918905
hl_amp_ratio  =  0.455440268166
kurtosis  =  -0.533256044776
n_points  =  308
period  =  0.843882492745
period_SNR  =  49.3336203886
period_log10FAP  =  -40.461454994
period_uncertainty  =  0.000204092710682
phase_cusum  =  0.267327072808
phase_eta  =  0.230520794746
phi21  =  0.83559604657
phi31  =  4.52841635733
quartile31  =  0.3025
r21  =  0.357571232289
r31  =  0.22880271264
shapiro_w  =  0.948343813419
skewness  =  -0.589779381513
slope_per10  =  -0.17387000192
slope_per90  =  0.224495537192
stetson_k  =  0.758059067676
weighted_mean  =  16.5092103545
weighted_std  =  0.199338478173
