-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.275811376335
cusum  =  0.144212318961
eta  =  0.703350964242
hl_amp_ratio  =  0.63723063515
kurtosis  =  -0.744362547824
n_points  =  311
period  =  0.606553376208
period_SNR  =  46.1271101697
period_log10FAP  =  -39.9966836146
period_uncertainty  =  0.00012651464978
phase_cusum  =  0.249918792364
phase_eta  =  0.139724141068
phi21  =  -2.09583469166
phi31  =  -3.8867360965
quartile31  =  0.405
r21  =  0.53921580251
r31  =  0.324216106051
shapiro_w  =  0.949162662029
skewness  =  -0.194934555421
slope_per10  =  -0.269991821434
slope_per90  =  0.367901807751
stetson_k  =  0.818912506706
weighted_mean  =  13.6402193864
weighted_std  =  0.240335764031
